TABLES

Pair ⟨r⟩ E_0(mK) 4He-^6Li 287.83 0.121 4He-^7Li 77.35 2.158 4He-^{23}Na 29.13 28.980 3He-^{23}Na 96.12 1.242 4He-^{39}K 39.60 11.202 4He-^{40}K 39.34 11.425 4He-^{41}K 30.09 11.641 4He-^{85}Rb 40.51 10.273 4He-^{87}Rb 40.40 10.362 4He-^{133}Cs 51.76 4.545 4He-^4He 97.69 1.321 m(^4He)=4.00260324 u =7296.2994 a.u. m(^3He)=3.10602931 u =5661.9451 a.u. m(^6Li)=6.0151214 u =10964.896 a.u. m(^7Li)=7.0160030 u =12789.391 a.u. m(^{23}Na)=22.9897677 u =41907.783 a.u. m(^{39}K)=38.9637074 u =71026.494 a.u. m(^{40}K)=39.9639992 u =72849.915 a.u. m(^{41}K)=40.9618254 u =74668.841 a.u. m(^{85}Rb)=84.911794 u =154784.73 a.u. m(^{87}Rb)=86.909187 u =158425.76 a.u. m(^{133}Cs)=132.905429 u =242271.78 a.u.